\section{Tests}

We believe that direct, fast GRBs in the MAGIC FOV are too valuable to allow for any technical or personal problems during the alert.

Therefore, we would like to make the following test:

\begin{enumerate}
\item A dedicated GRB test worked out in accordance with the shift crew where a fake GRB alert is sent to {\it gspot}. The shift 
should decide a night with good weather, but bad observation condition (e.g. due to clouds) for that case such that no real 
observation time gets lost.
\item Later, a blind test {\it without telling the shifters beforehand}. 
These tests are especially important to train the shift crew and make them aware of the 
importance of being available and reacting fast in such situations. 
\end{enumerate}




