\section{Criteria for the Optimal Signal Extraction (STILL TO DO!!)}

\subsection{Resolution and Bias} 
\ldots {\textit{The jitter to identical input pulses is measured, for times, amplitudes, 
high-gain and low-gain pulses and different signal and background levels }}

\subsection{Stability}
\ldots {\textit The stability of an extractor to slightly varying pulse shapes is examined. }

\subsection{Linearity}
\ldots {\textit The Nuria plots ... }

\subsection{Treatment of Calibration Pulses}

\subsection{Low Gain Extraction}
\ldots {\textit The stability of the low-gain extraction w.r.t. the high-gain extraction}

\subsection{Applicability for Different Sampling Speeds / No Pulse Shaping.}
\ldots {\textit Some comments by Hendrik ...}

\subsection{CPU Requirements}
\ldots {\textit The needed CPU time for each extractor}




\subsection{Pulpo Pulses}
\subsection{Cosmics Data?}
The results of this subsection are based on the following runs taken
on the 21st of September 2004.
\begin{itemize}
\item{Run 39000}: OffCrab11 at 19.1 degrees zenith angle and 106.2
azimuth.
\item{Run 39182}: CrabNebula at 19.0 degrees zenith angle and 106.0 azimuth.
\end{itemize}


%%% Local Variables: 
%%% mode: latex
%%% TeX-master: "MAGIC_signal_reco"
%%% End: 
