\begin{thebibliography}{1}

\bibitem{Magic-PMT}
A.~Ostankov et~al.,
\newblock {\em A study of the new hemispherical 6-dynodes PMT from electron
  tubes},
\newblock Nucl. Instrum. Meth. {\bf A442} (2000) 117.

\bibitem{MAGIC-analog-link-2}
E.~Lorenz et~al.,
\newblock {\em A fast, large dynamic range analog signal transfer system based
  on optical fibers},
\newblock Nucl. Instrum. Meth. {\bf A461} (2001) 517.

\bibitem{MAGIC-calibration}
T.~Schweizer et~al.,
\newblock {\em The optical calibration of the MAGIC telescope camera},
\newblock IEEE Trans. Nucl. Sci. {\bf 49} (2002) 2497.

\bibitem{NUMREC}
W.H.Press et~al.,
\newblock {\em Numerical Recipes in C++},
\newblock Cambridge University Press, second edition, 2002.

\bibitem{OF94}
W.~E. Cleland and E.~G. Stern,
\newblock {\em Signal processing considerations for liquid ionization
  calorimeters in a high rate environment},
\newblock Nucl. Instrum. Meth. {\bf A338} (1994) 467.

\bibitem{OF77}
A.~Papoulis,
\newblock {\em Signal analysis},
\newblock McGraw-Hill, 1977.

\end{thebibliography}
