\section{Monte Carlo \label{sec:mc}}

Comparing MC signal with and w/o noise for high and low gain pulses.

\begin{figure}[htp]%%[t!]
\centering
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_SlidW_NoNoise_HiGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_SlidW_WithNoise_HiGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_SlidW_NoNoise_LoGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_SlidW_WithNoise_LoGain.eps}
\caption{Time Resolution for Sliding extractors in deifferent window sizes for low (down) and high (upper) 
gain contribution, with (right) and with out (left) noise.}
\label{TimeRes_SlidW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_DFSpline_NoNoise_HiGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_DFSpline_WithNoise_HiGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_DFSpline_NoNoise_LoGain.eps}
\vspace{\floatsep}
  \includegraphics[width=0.38\linewidth]{TimeAndChargePlots/TDAS_TimeRes_DFSpline_WithNoise_LoGain.eps}
\caption{Time Resolution for Splines and Digital Filter extractors for low (down) and high (upper)  
gain contribution, with (right) and with out (left) noise.}
\label{TimeRes_DFSpline}
\end{figure}

\begin{figure}[htp]%%[t!]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_FixW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_FixW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_FixW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_FixW_WithNoise_LoGain.eps}
\caption{ Charge divided by number of photoelectrons versus the number of photoelectrons, for fixed window extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeDivNphe_FixW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_SlidW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_SlidW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_SlidW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_SlidW_WithNoise_LoGain.eps}
\caption{ Charge divided by number of photoelectrons versus the number of photoelectrons, for sliding window extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeDivNphe_SlidW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_DFSpline_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_DFSpline_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_DFSpline_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeDivNphevsNphe_DFSpline_WithNoise_LoGain.eps}
\caption{ Charge divided by number of photoelectrons versus the number of photoelectrons, for spline and 
digital filter extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeDivNphe_DFSpline}
\end{figure}

\begin{figure}[htp]%%[t!]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_FixW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_FixW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_FixW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_FixW_WithNoise_LoGain.eps}
\caption{ Charge divided by the conversion factor minus the number of photoelectrons 
versus the number of photoelectrons, for fixed window extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ConversionvsNphe_FixW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_SlidW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_SlidW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_SlidW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_SlidW_WithNoise_LoGain.eps}
\caption{ Charge divided by the conversion factor minus the number of photoelectrons  
versus the number of photoelectrons, for sliding window extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ConversionvsNphe_SlidW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_DFSpline_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_DFSpline_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_DFSpline_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ConversionvsNphe_DFSpline_WithNoise_LoGain.eps}
\caption{ Charge divided by the conversion factor minus the number of photoelectrons 
versus the number of photoelectrons, for spline and 
digital filter extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ConversionvsNphe_DFSpline}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_FixW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_FixW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_FixW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_FixW_WithNoise_LoGain.eps}
\caption{ Charge resolution versus the number of photoelectrons, for fixed window and spline extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeRes_FixW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_SlidW_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_SlidW_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_SlidW_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_SlidW_WithNoise_LoGain.eps}
\caption{ Charge resolution versus the number of photoelectrons, for sliding extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeRes_SlidW}
\end{figure}

\begin{figure}[htp]
\centering
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_DFSpline_NoNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_DFSpline_WithNoise_HiGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_DFSpline_NoNoise_LoGain.eps}
  \vspace{\floatsep}
  \includegraphics[width=0.4\linewidth]{TimeAndChargePlots/TDAS_ChargeRes_DFSpline_WithNoise_LoGain.eps}
\caption{ Charge resolution versus the number of photoelectrons, for spline and 
digital filter extractors 
in different window sizes for low (down) and high (upper) gain contribution, with (right) and with out (left) noise.}
\label{ChargeRes_DFSpline}
\end{figure}



%%% Local Variables: 
%%% mode: latex
%%% TeX-master: "MAGIC_signal_reco"
%%% End: 
