\section{Criteria for an optimal pedestal extraction}

\ldots {\it In this section, the distinction is made between: 
\begin{itemize}
\item Defining the pedestal RMS as contribution
to the extracted signal fluctuations (later used in the calibration) 
\item Defining the Pedestal Mean and RMS as the result of distributions obtained by 
applying the extractor to pedestal runs (yielding biases and modified widths).
\item Deriving the correct probability for background fluctuations based on the extracted signal height. 
  ( including biases and modified widths).
\end{itemize}
\ldots Florian + ??? 
\newline
\newline
}

%%% Local Variables: 
%%% mode: latex
%%% TeX-master: "MAGIC_signal_reco"
%%% TeX-master: "MAGIC_signal_reco"
%%% End: 
