0246810424446485052Graph33.544.555.566.5720406080100120GraphLog(E) [GeV]Zenith Angle (degrees)-4-202468101214Energy Threshold (GeV)36384042444648505254Discriminator (mV)2345678Energy Threshold (GeV)2030405060708090100110120Log(E) [GeV]0.511.522.533.544.5dN/dE4.5dN/dE0524681015202530354045hLogEnerNent = 7145 Mean = 1.5RMS = 0.290828.9 +- 2.0 GeVhLogEnerNent = 7145 Mean = 1.5RMS = 0.29081244.0 +- 2.1 GeV