10^{-2}

10^{-1}

1

10

10^2

0 10 20 30

(a)(a) height a.s.l. (km)

aerosol number density � N_p (cm^{-3})

0.14

0.16

0.18 0.2 0.22

0.24

0.26

0.28

300 400 500 600 700

(b) wavelength λ (nm)

aerosol attenuation coefficient � β_p(0,λ) (km^{-1})