0.7 0.75 0.8 0.85 0.9 0.95

0 10 20 30 λ = 300 nm

Distance to telescope (km)

Transmission θ = 0˚ θ = 40˚ θ = 60˚

θ = 80˚

0.7 0.75 0.8 0.85 0.9 0.95 1

0 10 20 30 λ = 400 nm

Distance to telescope (km)

Transmission

0.7 0.75 0.8 0.85 0.9 0.95 1

0 10 20 30 λ = 500 nm

Distance to telescope (km)

Transmission