0

0.005

0.01

0.015

0.02

0 20 40 (a)(a) height a.s.l. (km)

Ozone concentration D_3 (cm km^{-1})

10^{-3}

10^{-2}

10^{-1} 1 10 10^2

300 400 500 600 (b) wavelength (nm)

Vigroux coefficient A_v (cm^{-1})

(b)(b)