0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

0 20 40 60 80 λ = 300 nm θ (˚)

Transmission λ = 300 nm

Light from 5 km

10 km

20 km

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 20 40 60 80 λ = 400 nm θ (˚)

Transmission λ = 400 nm 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 20 40 60 80 λ = 500 nm θ (˚)

Transmission λ = 500 nm